en	Launch synchronization

en	Last synchronization

en	Next synchronization

en	ICS url

en	Do you really want to reset this calendar? This action cannot be undone

en	Reset

en	Label cannot be empty

en	label

en	Add

en	Synchronize reminders

en	Reminders

en	Auto sync deactivated

en	Automatic synchronization of this calendar is deactivated because it has generated too many errors or too many changes. ⤷A successful manual synchronization will reset this status and enable the automatic synchronization again. ⤷Manual synchronization can be done here via the ’Launch synchronization’ button or via the remote /containers/_sync API).