en	Next synchronization

en	Auto sync deactivated

en	Automatic synchronization of this calendar is deactivated because it has generated too many errors or too many changes. ⤷A successful manual synchronization will reset this status and enable the automatic synchronization again. ⤷Manual synchronization can be done here via the ’Launch synchronization’ button or via the remote /containers/_sync API).