en	Invalid maximum number of video conferencing accounts. Must be an integer.

en	Minimum time between two synchronizations
de	Minimale Dauer zwischen 2 Synchronisationen

en	Other URLs

en	Space separated list of additional FQDN. eg: "alias1.bluemind.domain.tld alias2.bluemind.domain.tld"