en	Authentication choice
it	Scelta del tipo di autenticazione

en	Authentication
it	Autenticazione

en	Internal
it	Interno

en	CAS

en	Kerberos

en	OpenID

en	Authentication parameters
it	Parametri di autenticazione

en	CAS server URL
it	URL del server CAS

en	CAS URL should be a valid http(s) url and end with /

en	Active Directory domain
it	Dominio Active Directory

en	Active Directory must not be empty

en	Active Directory server
it	IP pubblico del dominio Active Directory

en	Active Directory server must not be empty

en	Active Directory keytab file
it	File keytab di Active Directory

en	Missing keytab file

en	ktpass command principal name

en	useful to generate the keytab file on Active Directory server

en	Third-party OpenId server URL

en	Third-party OpenId server URL must not be empty

en	OpenId client ID

en	OpenId client ID must not be empty

en	OpenId client secret

en	OpenId client secret must not be empty