en	Authentication choice

en	Authentication

en	Internal

en	CAS

en	Kerberos

en	OpenID

en	Authentication parameters

en	CAS server URL

en	CAS URL should be a valid http(s) url and end with /

en	Active Directory domain

en	Active Directory must not be empty

en	Active Directory server
hu	Active Directory external IP

en	Active Directory server must not be empty

en	Active Directory keytab file

en	Missing keytab file

en	ktpass command principal name

en	useful to generate the keytab file on Active Directory server

en	Third-party OpenId server URL

en	Third-party OpenId server URL must not be empty

en	OpenId client ID

en	OpenId client ID must not be empty

en	OpenId client secret

en	OpenId client secret must not be empty