en	Authentication choice
de	Auswahl der Authentifizierung

en	Authentication
de	Authentifizierung

en	Internal
de	Intern

en	CAS

en	Kerberos

en	OpenID

en	Authentication parameters
de	Authentifizierungsparameter

en	CAS server URL
de	CAS Server-Url

en	CAS URL should be a valid http(s) url and end with /

en	Active Directory domain
de	Active Directory Domäne

en	Active Directory must not be empty

en	Active Directory server
de	Active Directory Server

en	Active Directory server must not be empty

en	Active Directory keytab file
de	Active Directory Keytab Datei

en	Missing keytab file

en	ktpass command principal name

en	useful to generate the keytab file on Active Directory server

en	Third-party OpenId server URL
de	OpenId Server-Url

en	Third-party OpenId server URL must not be empty

en	OpenId client ID
de	OpenId Client-ID

en	OpenId client ID must not be empty

en	OpenId client secret
de	OpenId Client-Passwort

en	OpenId client secret must not be empty