en	Memory size

en	Less than 6000MB were detected. This value is a minimum for production use with default settings.

en	Elasticsearch cluster is not operational

en	Servers are reachable and up to date

en	CPU count

en	You need at least two cores (physical or virtual).

en	en_US.UTF-8 locale availability

en	en_US.UTF-8 locale is missing on your computer. Consult your Linux distribution documentation to add it.

en	Setup wizard version

en	Setup wizard version is smaller than your BlueMind installation.

en	Hostname validity

en	Missing or invalid hostname

en	Subscription verification (internet access required)

en	Verification failure

en	Missing subscription.

en	Invalid subscription.

en	Subscription check failed. Please make sure BlueMind Setup Wizard can connect to the internet (https).

en	PostgreSQL validity

en	Upgraders OK

en	Upgraders not OK (invalid subscription)

en	Upgraders not OK (install bm-plugin-core-subscription package)

en	bm-plugin-core-subscription is missing

en	bm-plugin-core-subscription is installed

en	Subscription contacts